<template>
	<svg viewBox="0 0 2080 244" fill="none" xmlns="http://www.w3.org/2000/svg">
		<path
			fill-rule="evenodd"
			clip-rule="evenodd"
			d="M224.003 143.668C228.084 128.465 228.974 112.581 226.618 97.0172C224.262 81.4529 218.711 66.5445 210.314 53.2298C201.916 39.915 190.855 28.4821 177.824 19.65C164.794 10.8179 150.077 4.77787 134.599 1.90975C119.12 -0.958379 103.216 -0.592508 87.8865 2.98435C72.5567 6.5612 58.1329 13.2716 45.5224 22.6936C32.9119 32.1155 22.3876 44.0451 14.6115 57.7319C6.83529 71.4187 1.97554 86.5665 0.337891 102.223H19.6374C22.2818 81.3106 31.8393 61.8821 46.7913 47.0246C61.7433 32.167 81.2319 22.7327 102.16 20.2209C123.089 17.709 144.256 22.2637 162.3 33.1611C180.343 44.0586 194.226 60.6736 201.744 80.366L182.991 85.3839C178.798 75.3032 172.451 66.2618 164.394 58.8938C156.337 51.5258 146.765 46.0096 136.351 42.7321L132.893 62.2406C143.113 65.9922 151.995 72.683 158.42 81.4709C164.846 90.2587 168.529 100.751 169.005 111.627C169.481 122.503 166.73 133.277 161.097 142.593C155.464 151.909 147.201 159.35 137.348 163.981L142.479 183.12C157.683 176.823 170.387 165.69 178.624 151.443C186.861 137.196 190.171 120.632 188.041 104.313L206.73 99.3278C208.703 111.795 208.123 124.533 205.025 136.769L224.003 143.668Z"
			fill="var(--color-brand)"
		/>
		<path
			d="M143.347 224.098C127.126 228.453 110.143 229.172 93.6119 226.205C77.0807 223.237 61.4086 216.656 47.7152 206.931C34.0217 197.205 22.6445 184.577 14.3963 169.946C6.14811 155.315 1.23231 139.044 0 122.294H19.2995C19.8015 127.678 20.7592 133.009 22.1622 138.232C23.626 143.709 25.5799 149.043 28.0003 154.17L45.1769 143.861C40.1515 132.219 38.1632 119.493 39.3982 106.873C40.6332 94.2538 45.0512 82.1543 52.2382 71.708C59.4252 61.2618 69.1461 52.8107 80.4903 47.1464C91.8346 41.482 104.431 38.7898 117.1 39.3218L113.61 58.8304C105.159 58.8689 96.8301 60.8438 89.262 64.6033C81.6939 68.3629 75.0882 73.8071 69.9523 80.5178C64.8165 87.2284 61.287 95.027 59.6352 103.314C57.9833 111.602 58.253 120.158 60.4235 128.325C60.922 130.142 61.4528 131.943 62.1443 133.552L84.1136 120.38L77.5357 102.881L98.2826 81.5716L124.514 75.9265L132.057 85.3029L119.962 97.5419L109.428 100.855L101.885 108.607L105.584 118.868C105.584 118.868 113.047 126.813 113.063 126.813L123.629 124.014L131.14 115.764L147.545 110.553L152.369 121.554L135.515 142.285L107.144 151.243L94.4066 137.074L72.2283 150.406C77.9374 156.904 85.0889 161.975 93.1099 165.211C101.131 168.448 109.798 169.762 118.418 169.047L123.549 188.233C110.747 189.905 97.7303 188.241 85.7605 183.403C73.7907 178.565 63.2736 170.717 55.2287 160.619L38.1165 170.88C47.8897 183.71 60.7815 193.829 75.5669 200.273C90.3522 206.717 106.54 209.274 122.592 207.699C138.643 206.124 154.026 200.471 167.277 191.277C180.528 182.082 191.208 169.652 198.302 155.167L217.28 162.067C210.254 177.191 199.989 190.587 187.214 201.306C174.438 212.026 159.462 219.806 143.347 224.098Z"
			fill="var(--color-brand)"
		/>
		<path
			d="M411.102 86C419.636 86 427.169 87.6667 433.702 91C440.369 94.3333 445.569 99.4667 449.302 106.4C453.036 113.2 454.902 122 454.902 132.8V194H429.902V136C429.902 126.533 427.836 119.467 423.702 114.8C419.569 110.133 413.636 107.8 405.902 107.8C400.436 107.8 395.569 109 391.302 111.4C387.169 113.8 383.902 117.333 381.502 122C379.236 126.667 378.102 132.6 378.102 139.8V194H353.102V136C353.102 126.533 351.036 119.467 346.902 114.8C342.769 110.133 336.836 107.8 329.102 107.8C323.636 107.8 318.769 109 314.502 111.4C310.369 113.8 307.102 117.333 304.702 122C302.436 126.667 301.302 132.6 301.302 139.8V194H276.302V87.2H300.102V115.6L295.902 107.2C299.502 100.267 304.702 95 311.502 91.4C318.436 87.8 326.302 86 335.102 86C345.102 86 353.769 88.4667 361.102 93.4C368.569 98.3333 373.502 105.8 375.902 115.8L366.102 112.4C369.569 104.4 375.302 98 383.302 93.2C391.302 88.4 400.569 86 411.102 86ZM535.045 195.4C524.111 195.4 514.378 193.067 505.845 188.4C497.311 183.6 490.578 177.067 485.645 168.8C480.711 160.533 478.245 151.133 478.245 140.6C478.245 129.933 480.711 120.533 485.645 112.4C490.578 104.133 497.311 97.6667 505.845 93C514.378 88.3333 524.111 86 535.045 86C546.111 86 555.911 88.3333 564.445 93C573.111 97.6667 579.845 104.067 584.645 112.2C589.578 120.333 592.045 129.8 592.045 140.6C592.045 151.133 589.578 160.533 584.645 168.8C579.845 177.067 573.111 183.6 564.445 188.4C555.911 193.067 546.111 195.4 535.045 195.4ZM535.045 174C541.178 174 546.645 172.667 551.445 170C556.245 167.333 559.978 163.467 562.645 158.4C565.445 153.333 566.845 147.4 566.845 140.6C566.845 133.667 565.445 127.733 562.645 122.8C559.978 117.733 556.245 113.867 551.445 111.2C546.645 108.533 541.245 107.2 535.245 107.2C529.111 107.2 523.645 108.533 518.845 111.2C514.178 113.867 510.445 117.733 507.645 122.8C504.845 127.733 503.445 133.667 503.445 140.6C503.445 147.4 504.845 153.333 507.645 158.4C510.445 163.467 514.178 167.333 518.845 170C523.645 172.667 529.045 174 535.045 174ZM661.151 195.4C650.884 195.4 641.617 193.133 633.351 188.6C625.217 183.933 618.817 177.533 614.151 169.4C609.484 161.267 607.151 151.667 607.151 140.6C607.151 129.533 609.484 119.933 614.151 111.8C618.817 103.667 625.217 97.3333 633.351 92.8C641.617 88.2667 650.884 86 661.151 86C670.084 86 678.084 88 685.151 92C692.217 95.8667 697.817 101.8 701.951 109.8C706.084 117.8 708.151 128.067 708.151 140.6C708.151 153 706.151 163.267 702.151 171.4C698.151 179.4 692.617 185.4 685.551 189.4C678.484 193.4 670.351 195.4 661.151 195.4ZM664.151 174C670.151 174 675.484 172.667 680.151 170C684.951 167.333 688.751 163.467 691.551 158.4C694.484 153.333 695.951 147.4 695.951 140.6C695.951 133.667 694.484 127.733 691.551 122.8C688.751 117.733 684.951 113.867 680.151 111.2C675.484 108.533 670.151 107.2 664.151 107.2C658.151 107.2 652.751 108.533 647.951 111.2C643.284 113.867 639.484 117.733 636.551 122.8C633.751 127.733 632.351 133.667 632.351 140.6C632.351 147.4 633.751 153.333 636.551 158.4C639.484 163.467 643.284 167.333 647.951 170C652.751 172.667 658.151 174 664.151 174ZM696.551 194V168.8L697.551 140.4L695.551 112V45.6H720.351V194H696.551ZM753.255 194V87.2H777.055V116.6L774.255 108C777.455 100.8 782.455 95.3333 789.255 91.6C796.189 87.8667 804.789 86 815.055 86V109.8C813.989 109.533 812.989 109.4 812.055 109.4C811.122 109.267 810.189 109.2 809.255 109.2C799.789 109.2 792.255 112 786.655 117.6C781.055 123.067 778.255 131.267 778.255 142.2V194H753.255ZM836.263 194V87.2H861.263V194H836.263ZM848.863 69.6C844.197 69.6 840.33 68.1333 837.263 65.2C834.33 62.2667 832.863 58.7333 832.863 54.6C832.863 50.3333 834.33 46.8 837.263 44C840.33 41.0667 844.197 39.6 848.863 39.6C853.53 39.6 857.33 41 860.263 43.8C863.33 46.4667 864.863 49.8667 864.863 54C864.863 58.4 863.397 62.1333 860.463 65.2C857.53 68.1333 853.663 69.6 848.863 69.6ZM954.676 86C963.209 86 970.809 87.6667 977.476 91C984.276 94.3333 989.609 99.4667 993.476 106.4C997.342 113.2 999.276 122 999.276 132.8V194H974.276V136C974.276 126.533 972.009 119.467 967.476 114.8C963.076 110.133 956.876 107.8 948.876 107.8C943.009 107.8 937.809 109 933.276 111.4C928.742 113.8 925.209 117.4 922.676 122.2C920.276 126.867 919.076 132.8 919.076 140V194H894.076V87.2H917.876V116L913.676 107.2C917.409 100.4 922.809 95.2 929.876 91.6C937.076 87.8667 945.342 86 954.676 86ZM1071.19 195.4C1059.46 195.4 1050.39 192.4 1043.99 186.4C1037.59 180.267 1034.39 171.267 1034.39 159.4V63.6H1059.39V158.8C1059.39 163.867 1060.66 167.8 1063.19 170.6C1065.86 173.4 1069.52 174.8 1074.19 174.8C1079.79 174.8 1084.46 173.333 1088.19 170.4L1095.19 188.2C1092.26 190.6 1088.66 192.4 1084.39 193.6C1080.12 194.8 1075.72 195.4 1071.19 195.4ZM1016.79 108V88H1087.99V108H1016.79ZM1176.36 86C1184.89 86 1192.49 87.6667 1199.16 91C1205.96 94.3333 1211.29 99.4667 1215.16 106.4C1219.02 113.2 1220.96 122 1220.96 132.8V194H1195.96V136C1195.96 126.533 1193.69 119.467 1189.16 114.8C1184.76 110.133 1178.56 107.8 1170.56 107.8C1164.69 107.8 1159.49 109 1154.96 111.4C1150.42 113.8 1146.89 117.4 1144.36 122.2C1141.96 126.867 1140.76 132.8 1140.76 140V194H1115.76V45.6H1140.76V116L1135.36 107.2C1139.09 100.4 1144.49 95.2 1151.56 91.6C1158.76 87.8667 1167.02 86 1176.36 86Z"
			fill="currentColor"
		/>
		<path
			d="M1368.54 86C1377.08 86 1384.68 87.6667 1391.34 91C1398.14 94.3333 1403.48 99.4667 1407.34 106.4C1411.21 113.2 1413.14 122 1413.14 132.8V194H1388.14V136C1388.14 126.533 1385.88 119.467 1381.34 114.8C1376.94 110.133 1370.74 107.8 1362.74 107.8C1356.88 107.8 1351.68 109 1347.14 111.4C1342.61 113.8 1339.08 117.4 1336.54 122.2C1334.14 126.867 1332.94 132.8 1332.94 140V194H1307.94V45.6H1332.94V116L1327.54 107.2C1331.28 100.4 1336.68 95.2 1343.74 91.6C1350.94 87.8667 1359.21 86 1368.54 86ZM1493.05 195.4C1482.12 195.4 1472.39 193.067 1463.85 188.4C1455.32 183.6 1448.59 177.067 1443.65 168.8C1438.72 160.533 1436.25 151.133 1436.25 140.6C1436.25 129.933 1438.72 120.533 1443.65 112.4C1448.59 104.133 1455.32 97.6667 1463.85 93C1472.39 88.3333 1482.12 86 1493.05 86C1504.12 86 1513.92 88.3333 1522.45 93C1531.12 97.6667 1537.85 104.067 1542.65 112.2C1547.59 120.333 1550.05 129.8 1550.05 140.6C1550.05 151.133 1547.59 160.533 1542.65 168.8C1537.85 177.067 1531.12 183.6 1522.45 188.4C1513.92 193.067 1504.12 195.4 1493.05 195.4ZM1493.05 174C1499.19 174 1504.65 172.667 1509.45 170C1514.25 167.333 1517.99 163.467 1520.65 158.4C1523.45 153.333 1524.85 147.4 1524.85 140.6C1524.85 133.667 1523.45 127.733 1520.65 122.8C1517.99 117.733 1514.25 113.867 1509.45 111.2C1504.65 108.533 1499.25 107.2 1493.25 107.2C1487.12 107.2 1481.65 108.533 1476.85 111.2C1472.19 113.867 1468.45 117.733 1465.65 122.8C1462.85 127.733 1461.45 133.667 1461.45 140.6C1461.45 147.4 1462.85 153.333 1465.65 158.4C1468.45 163.467 1472.19 167.333 1476.85 170C1481.65 172.667 1487.05 174 1493.05 174ZM1606.96 195.4C1598.03 195.4 1589.43 194.267 1581.16 192C1573.03 189.6 1566.56 186.733 1561.76 183.4L1571.36 164.4C1576.16 167.467 1581.89 170 1588.56 172C1595.23 174 1601.89 175 1608.56 175C1616.43 175 1622.09 173.933 1625.56 171.8C1629.16 169.667 1630.96 166.8 1630.96 163.2C1630.96 160.267 1629.76 158.067 1627.36 156.6C1624.96 155 1621.83 153.8 1617.96 153C1614.09 152.2 1609.76 151.467 1604.96 150.8C1600.29 150.133 1595.56 149.267 1590.76 148.2C1586.09 147 1581.83 145.333 1577.96 143.2C1574.09 140.933 1570.96 137.933 1568.56 134.2C1566.16 130.467 1564.96 125.533 1564.96 119.4C1564.96 112.6 1566.89 106.733 1570.76 101.8C1574.63 96.7333 1580.03 92.8667 1586.96 90.2C1594.03 87.4 1602.36 86 1611.96 86C1619.16 86 1626.43 86.8 1633.76 88.4C1641.09 90 1647.16 92.2667 1651.96 95.2L1642.36 114.2C1637.29 111.133 1632.16 109.067 1626.96 108C1621.89 106.8 1616.83 106.2 1611.76 106.2C1604.16 106.2 1598.49 107.333 1594.76 109.6C1591.16 111.867 1589.36 114.733 1589.36 118.2C1589.36 121.4 1590.56 123.8 1592.96 125.4C1595.36 127 1598.49 128.267 1602.36 129.2C1606.23 130.133 1610.49 130.933 1615.16 131.6C1619.96 132.133 1624.69 133 1629.36 134.2C1634.03 135.4 1638.29 137.067 1642.16 139.2C1646.16 141.2 1649.36 144.067 1651.76 147.8C1654.16 151.533 1655.36 156.4 1655.36 162.4C1655.36 169.067 1653.36 174.867 1649.36 179.8C1645.49 184.733 1639.96 188.6 1632.76 191.4C1625.56 194.067 1616.96 195.4 1606.96 195.4ZM1717.09 195.4C1705.35 195.4 1696.29 192.4 1689.89 186.4C1683.49 180.267 1680.29 171.267 1680.29 159.4V63.6H1705.29V158.8C1705.29 163.867 1706.55 167.8 1709.09 170.6C1711.75 173.4 1715.42 174.8 1720.09 174.8C1725.69 174.8 1730.35 173.333 1734.09 170.4L1741.09 188.2C1738.15 190.6 1734.55 192.4 1730.29 193.6C1726.02 194.8 1721.62 195.4 1717.09 195.4ZM1662.69 108V88H1733.89V108H1662.69ZM1761.65 194V87.2H1786.65V194H1761.65ZM1774.25 69.6C1769.59 69.6 1765.72 68.1333 1762.65 65.2C1759.72 62.2667 1758.25 58.7333 1758.25 54.6C1758.25 50.3333 1759.72 46.8 1762.65 44C1765.72 41.0667 1769.59 39.6 1774.25 39.6C1778.92 39.6 1782.72 41 1785.65 43.8C1788.72 46.4667 1790.25 49.8667 1790.25 54C1790.25 58.4 1788.79 62.1333 1785.85 65.2C1782.92 68.1333 1779.05 69.6 1774.25 69.6ZM1880.07 86C1888.6 86 1896.2 87.6667 1902.87 91C1909.67 94.3333 1915 99.4667 1918.87 106.4C1922.73 113.2 1924.67 122 1924.67 132.8V194H1899.67V136C1899.67 126.533 1897.4 119.467 1892.87 114.8C1888.47 110.133 1882.27 107.8 1874.27 107.8C1868.4 107.8 1863.2 109 1858.67 111.4C1854.13 113.8 1850.6 117.4 1848.07 122.2C1845.67 126.867 1844.47 132.8 1844.47 140V194H1819.47V87.2H1843.27V116L1839.07 107.2C1842.8 100.4 1848.2 95.2 1855.27 91.6C1862.47 87.8667 1870.73 86 1880.07 86ZM2004.98 234.2C1995.11 234.2 1985.44 232.867 1975.98 230.2C1966.64 227.667 1958.98 223.933 1952.98 219L1964.18 200.2C1968.84 204.067 1974.71 207.133 1981.78 209.4C1988.98 211.8 1996.24 213 2003.58 213C2015.31 213 2023.91 210.267 2029.38 204.8C2034.84 199.467 2037.58 191.4 2037.58 180.6V161.6L2039.58 137.4L2038.78 113.2V87.2H2062.58V177.8C2062.58 197.133 2057.64 211.333 2047.78 220.4C2037.91 229.6 2023.64 234.2 2004.98 234.2ZM2001.78 189.2C1991.64 189.2 1982.44 187.067 1974.18 182.8C1966.04 178.4 1959.58 172.333 1954.78 164.6C1950.11 156.867 1947.78 147.8 1947.78 137.4C1947.78 127.133 1950.11 118.133 1954.78 110.4C1959.58 102.667 1966.04 96.6667 1974.18 92.4C1982.44 88.1333 1991.64 86 2001.78 86C2010.84 86 2018.98 87.8 2026.18 91.4C2033.38 95 2039.11 100.6 2043.38 108.2C2047.78 115.8 2049.98 125.533 2049.98 137.4C2049.98 149.267 2047.78 159.067 2043.38 166.8C2039.11 174.4 2033.38 180.067 2026.18 183.8C2018.98 187.4 2010.84 189.2 2001.78 189.2ZM2005.58 168C2011.84 168 2017.44 166.733 2022.38 164.2C2027.31 161.533 2031.11 157.933 2033.78 153.4C2036.58 148.733 2037.98 143.4 2037.98 137.4C2037.98 131.4 2036.58 126.133 2033.78 121.6C2031.11 116.933 2027.31 113.4 2022.38 111C2017.44 108.467 2011.84 107.2 2005.58 107.2C1999.31 107.2 1993.64 108.467 1988.58 111C1983.64 113.4 1979.78 116.933 1976.98 121.6C1974.31 126.133 1972.98 131.4 1972.98 137.4C1972.98 143.4 1974.31 148.733 1976.98 153.4C1979.78 157.933 1983.64 161.533 1988.58 164.2C1993.64 166.733 1999.31 168 2005.58 168Z"
			fill="var(--color-brand)"
		/>
	</svg>
</template>
