<script setup lang="ts">
import { CpuIcon, DatabaseIcon, MemoryStickIcon, SparklesIcon, UnknownIcon } from '@modrinth/assets'
import { computed } from 'vue'

import AutoLink from '../base/AutoLink.vue'

const emit = defineEmits<{
	(e: 'click-bursting-link'): void
}>()

const props = withDefaults(
	defineProps<{
		ram: number
		storage: number
		cpus: number
		burstingLink?: string
	}>(),
	{
		burstingLink: undefined,
	},
)

const formattedRam = computed(() => {
	return props.ram / 1024
})

const formattedStorage = computed(() => {
	return props.storage / 1024
})

const sharedCpus = computed(() => {
	return props.cpus / 2
})
</script>
<template>
	<ul class="m-0 flex list-none flex-col gap-2 px-0 text-sm leading-normal text-secondary">
		<li class="flex items-center gap-2">
			<MemoryStickIcon class="h-5 w-5 shrink-0" /> {{ formattedRam }} GB RAM
		</li>
		<li class="flex items-center gap-2">
			<DatabaseIcon class="h-5 w-5 shrink-0" /> {{ formattedStorage }} GB Storage
		</li>
		<li class="flex items-center gap-2">
			<CpuIcon class="h-5 w-5 shrink-0" /> {{ sharedCpus }} Shared CPUs
		</li>
		<li class="flex items-center gap-2">
			<SparklesIcon class="h-5 w-5 shrink-0" /> Bursts up to {{ cpus }} CPUs
			<AutoLink
				v-if="burstingLink"
				v-tooltip="
					`CPU bursting allows your server to temporarily use additional threads to help mitigate TPS spikes. Click for more info.`
				"
				class="flex"
				:to="burstingLink"
				@click="() => emit('click-bursting-link')"
			>
				<UnknownIcon class="h-4 w-4 text-secondary opacity-80" />
			</AutoLink>
		</li>
	</ul>
</template>
